• Worked as a <strong data-start="45" data-end="74">Project Management Intern</strong> on the <strong>(1,908.17 Crore) Centurian Park Phase–III EPC residential township project</strong> comprising <strong data-start="171" data-end="292">10 residential towers (G+30), one iconic tower (G+45), a commercial complex, clubhouse, and associated infrastructure</strong> under <em><strong data-start="299" data-end="323">NBCC (India) Limited</strong>.</em>
• Assisted in monitoring the execution of <strong data-start="369" data-end="408">structural and finishing activities</strong> to ensure compliance with <strong data-start="435" data-end="550">approved drawings, project specifications, construction methodologies, quality standards, and project schedules</strong>.
• Participated in <strong data-start="572" data-end="592">site inspections</strong> involving <strong data-start="603" data-end="778">reinforcement verification, formwork alignment, concreting, Self-Compacting Concrete (SCC), post-tensioning, waterproofing, masonry, and post-concreting quality assessment</strong> across various stages of construction.
• Assisted in <strong data-start="1154" data-end="1203">Quality Assurance and Quality Control (QA/QC)</strong> activities through verification of <strong data-start="1239" data-end="1390">reinforcement detailing, dimensional checks, material testing records, inspection requests, non-conformance observations, and rectification reports</strong>.
• Observed coordination among <strong data-start="1469" data-end="1595">NBCC (Client/PMC), the EPC contractor, consultants, technical experts, and the third-party quality inspection agency (NIT)</strong> to understand <strong data-start="1610" data-end="1722">stakeholder coordination, technical approval workflows, quality governance, and project reporting mechanisms</strong>.
• Assisted in <strong data-start="930" data-end="965">reviewing engineering documents</strong> and maintaining <strong data-start="982" data-end="1082">project documentation, inspection records, material test reports, and quality compliance records</strong> in accordance with <strong data-start="1102" data-end="1162">established project procedures and engineering standards</strong>.