<p>1. Developed and updated detailed Project Schedules in Microsoft Project (MSP); monitored Baseline vs Actual Progress, performed Critical Path Analysis (CPA), variance analysis, and implemented corrective action plans to achieve milestone targets.<br />2. Coordinated with Civil, Structural, Fa&Atilde;&sect;ade, and MEP teams to ensure proper activity sequencing as per approved schedule; monitored 2-week and 4-week Look-Ahead Plans and ensured resource alignment to mitigate delays.<br />3. Prepared and submitted comprehensive Weekly Progress Reports (WPR) including physical progress %, manpower deployment, material status, key milestones achieved, critical risks, and mitigation strategies.<br />4. Managed coordination of Finishing Works, MEP Installation, Testing &amp; Commissioning (T&amp;C), Snag Closure, and Statutory Inspections to enable phased handover (lifts, washrooms, and operational areas).<br />5. Tracked and coordinated key statutory approvals including Fire NOC (Provisional &amp; Final), MPCB Consent (CTE &amp; CTO), MIDC Approvals, Lift Inspector Approval, Electrical Load Sanction (2700 KVA), Plinth Checking, and Environmental Clearance, ensuring regulatory compliance without schedule impact.<br />6. Liaised with Architects, Consultants, Statutory Authorities, and Client Representatives to ensure timely submissions, approval follow-ups, and effective documentation control.</p>